Higher-z Requir es Calibrating SNe Ia in the UV

U B V

z-band at z=1.5

Observing SNe Ia at z~1.5 in the optical---> U-band

U-band previously unexplored, but new data demonstrates use (Jha et al)

U-band also region of SED to explore metallicity dependences

Hoflich et al.

and ferret out systematics